HTTP/1.1 200 OK Cache-Control: private Content-Length: 0 Server: Microsoft-IIS/7.5 X-Powered-By: ezEIP X-Frame-Options: SAMEORIGIN Date: Fri, 22 Aug 2025 03:42:02 GMT