HTTP/1.1 200 OK Cache-Control: private Content-Length: 0 Server: Microsoft-IIS/7.5 X-Powered-By: ezEIP X-Frame-Options: SAMEORIGIN Date: Sun, 28 Sep 2025 01:44:51 GMT